<template>
  <div>
    <p>
      <b>
        Before starting camera calibration:
      </b>
    </p>
    <ul class="uk-list uk-list-bullet">
      <li>Remove any samples from your microscope</li>
      <li>Ensure your illumination is on, well focused, and centred.</li>
    </ul>
  </div>
</template>

<script>
export default {
  name: "CamCalibrationExplanation",
};
</script>
